en	An authentication exception occurred.

en	Authentication credentials could not be found.

en	Authentication request could not be processed due to a system problem.

en	Invalid credentials.

en	Cookie has already been used by someone else.

en	Not privileged to request the resource.

en	Invalid CSRF token.

en	No authentication provider found to support the authentication token.

en	No session available, it either timed out or cookies are not enabled.

en	No token could be found.

en	Username could not be found.

en	Account has expired.

en	Credentials have expired.

en	Account is disabled.

en	Account is locked.

en	Too many failed login attempts, please try again later.

en	Invalid or expired login link.

en	Too many failed login attempts, please try again in %minutes% minute.